Table 3: The list of stars used for the determination of the Spectral Response Function of chopped PHT-S observations

Star Name m_K Sp.Type TDT # Chopp. mode t_{res}[s] t_{chop}[s] t_{exp}[s] HR 6464 1.65 M0III SL0163601102 Triang. 4 16 1024 HR 5986 2.73 F8IV-V SL0166400502 Triang. 8 32 1024 HR 6817 3.77 K1III SL0167800801 Rect. 16 64 1024 HR 6817 3.77 K1III SL0167800902 Triang. 16 64 1024 HR 6847 4.79 G2V SL0169300401 Rect. 32 128 2048 HR 6847 4.79 G2V SL0169300502 Triang. 32 128 2048 HD 132142 5.79 K1V SL0163600901 Rect. 32 128 2048 HD 132142 5.79 K1V SL0163601002 Triang. 32 128 2048 HD172323 6.59 F9V SL0168501601 Rect. 32 128 2048 HD184400 7.54 F5 SL0184604401 Rect. 32 128 4096