Wavelength Calibration of LWS Fabry-Perot data.

M.G. Hutchinson^1, S.D. Sidher^{1,2}, B.M. Swinyard^1 and S. Pezzuto^3

1Rutherford Appleton Laboratory, Chilton, Didcot, Oxon OX11 0QX, United Kingdom 2Queen Mary & Westfield College, London E1 4NS, United Kingdom 3IFSI-CNR, Via Fosso del Cavaliere, 100, 00162 Roma, Italy

With the release of the ISO Legacy archive, many high quality, high resolution LWS Fabry-Perot observations are available to the astronomical community.

We look briefly at a few of the problems which were encountered whilst the wavelength calibration of this data was being refined, concentrating on the derivation and testing of the final wavelength calibration which is used in the OLP 10 pipeline processing of the Legacy Archive.